<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">%
% The Hotspin 2 Instrument
% ===========================================================================
% This is part of the diploma thesis "The Hotspin 2 Instrument".
% (c) Michael Wack 2005,2006
%

\chapter{Verzeichnis der Datenblätter und Betriebsanleitungen}
\label{cha:doku}

Die hier aufgeführten Dokumente finden sich auf der beiliegenden CD-ROM.

% Zeilenabstand in den Tabellen vergrößern
\renewcommand{\arraystretch}{2}

\begin{longtable}[h]{p{2cm}p{10cm}p{3cm}}
		%Typ &amp; Funktion &amp; Datenblatt\\
		%\hline
		$[$78XX$]$ &amp; POSITIVE VOLTAGE REGULATORS &amp; 78XX.pdf \\
		$[$79XX$]$ &amp; NEGATIVE VOLTAGE REGULATORS &amp; 79XX.pdf \\
		$[$CERMET$]$ &amp; 248 \&amp; 249 Conductive Plastic \&amp; Cermet Potentiometers &amp; CERMET.pdf \\
		$[$HED261$]$ &amp; 8 DIGIT COUNTER WITH HIGH/LOW SPEED COUNT INPUTS AND OPTIONAL BACKLIGHTING &amp; HED261.pdf \\
		$[$INA126$]$ &amp; MicroPOWER INSTRUMENTATION AMPLIFIER Single and Dual Versions &amp; INA126.pdf \\
		$[$LTC1062$]$ &amp; 5th Order Lowpass Filter &amp; LTC1062.pdf \\
		$[$MAX280$]$ &amp; 5th Order, Zero DC Error, Lowpass Filter &amp; MAX280.pdf \\
		$[$PC900$]$ &amp; Digital Output Type OPIC Photocoupler &amp; PC900.pdf\\
		$[$TL072$]$ &amp; LOW-NOISE JFET-INPUT OPERATIONAL AMPLIFIERS &amp; TL072.pdf \\
		\caption{Verzeichnis der verwendeten Datenblätter}
\end{longtable}

\begin{longtable}[h]{p{2cm}p{10cm}p{3cm}}
		%Typ &amp; Funktion &amp; Datenblatt\\
		%\hline
		$[$2000CH$]$ &amp; Series 2000 Communications Handbook &amp; 2000CH.pdf\\
		$[$2216e$]$ &amp; Temperaturregler Modell 2216e, Bedienungsanleitung &amp; 2216e.pdf\\
		$[$C8051F35$]$ &amp; C8051F350/1/2/3, Handbook &amp; C8051F35.pdf\\
		$[$MAG03$]$ &amp; OPERATION MANUAL FOR Mag-03 RANGE OF THREE AXIS MAGNETIC FIELD SENSORS &amp; MAG03.pdf\\
	\caption{Verzeichnis der verwendeten Betriebsanleitungen}
\end{longtable}
%
% EOF
%
</pre></body></html>